\ifthenelse{\equal{IJMPB}{\TschStyle}}{% 
%
\begin{table}[htbp] 
\tbl{Effective temperatures
     $T_{\mbox{{\scriptsize\rm ground}}}$
     in dependence of the parameter $\epsilon$.}
{     
\begin{tabular}{@{}crr@{}} 
\Hline 
\\[-1.8ex] 
$\epsilon$  
       &  $T_{\mbox{{\scriptsize\rm ground}}}\,[{\rm K}]$ 
       &  $T_{\mbox{{\scriptsize\rm ground}}}\,[^\circ{\rm C}]$ 
\\[0.8ex]
\hline
\\[-1.8ex] 
$1.00$            & $394.2$ & $121.2$ \\
$0.70$            & $360.6$ & $ 87.6$ \\
$0.62$            & $349.8$ & $ 76.8$ 
\\[0.8ex]
\hline
\\[-1.8ex] 
\end{tabular}
}
\label{temps}
\end{table}
%
}{}
\ifthenelse{\equal{arXivOrTeX4ht}{\TschStyles}}{% 
%
\begin{table}[htbp] 
{
\begin{center}
\vspace*{0.5cm}     
\begin{tabular}{|c|r|r|} 
\hline 
$\epsilon$  &  $T_{\mbox{{\scriptsize\rm Earth's ground}}}\,[{\rm K}]$ 
            &  $T_{\mbox{{\scriptsize\rm Earth's ground}}}\,[^\circ{\rm C}]$ 
\\
\hline
$1.00$            & $394.2$ & $121.2$ \\
$0.70$            & $360.6$ & $ 87.6$ \\
$0.62$            & $349.8$ & $ 76.8$ 
\\
\hline
\end{tabular}
\end{center}
}
\caption{Effective temperatures
         $T_{\mbox{{\scriptsize\rm Earth's ground}}}$
         in dependence of the phenomenological
         normalization parameter $\epsilon$.}
\label{temps}
%
\vspace*{0.5cm}
%
\end{table}
%
}{} 
